Centrality (%)

0 10 20 30 40 50 60

)〉 {2} 3v〈〉A〈 -〉A{2}_3v〈(η/d_{ch}dN

0.004 - 0.002 - 0 0.002

0.004

0.006

0.008

0.01

0.012

0.014 neg-pos

ALICE = 2.76 TeV NNs Pb-Pb c < 5.0 GeV/ Tp 0.2 < < 0.8 η -0.8 <